Erratum:

Yu. A. Logvin, T. Ackemann, and W. Lange. Winking Hexagons.

Europhys. Lett. 38, 583-588, 1997.

The curves displayed in figure of [1] corresponds to a value of the diffusion coefficient of D = 100 mm^2.

The correct figure is displayed below (Fig. 2). For D = 200 mm^2 the static Turing modes are slightly damped, cf. the discussion in [2].

References

[1] Yu. A. Logvin, T. Ackemann, and W. Lange. Winking Hexagons. Europhys. Lett. 38, 583-588, 1997.

[2] Yu. A. Logvin, and T. Ackemann. Interaction between Hopf and static instabilities in a pattern-forming optical system. Phys. Rev. E 58, 1654-1661, 1998.

Figure 2: Neutral stability curves for the static (S) and for Hopf (H) instabilities in the space spanned by the external pump P_0 and the wavenumber of the transverse perturbation k_⊥. Parameters: k = 2π/589.6 nm, Δ̄ = 8, R = 0.915, l = 15 mm, Ω_z/2π = 100 kHz, Ω_x/2π = 9 kHz, d = 100 mm, D = 200 mm^2/s, N = 8 · 10^{13} cm^{−3}. The horizontal line marks the pump value at which the simulations have been performed.